// SEE COPYRIGHT and LICENCE NOTICES: files README-COPYRIGHT-utf8.txt and
// README-LICENCE-utf8.txt at project source root.

:AUTHOR: Eric Debreuve
:EMAIL: eric.debreuve@cnrs.fr

:PROJECT_NAME: DAccuracy
:SHORT_DESCRIPTION: Detection and Segmentation Accuracy Measures
:KEYWORDS: image, object detection, segmentation, accuracy

:REPOSITORY_NAME: daccuracy
:REPOSITORY_USER: eric.debreuve
:REPOSITORY_ROOT: src.koda.cnrs.fr
:DOCUMENTATION_SITE: [...]-/wikis/home
:SINCE_YEAR: 2019

:LICENSE_SHORT: CeCILL-2.1
:LICENCE_LONG: CEA CNRS Inria Logiciel Libre License, version 2.1
:PY_VERSION_MIN: 3.9

:PYPI_NAME: daccuracy
:PYPI_TOPIC: Scientific/Engineering :: Image Recognition
:PYPI_AUDIENCE: Science/Research
:PYPI_STATUS: 5 - Production/Stable

:IMPORT_NAME: daccuracy
:CONFIG_FOLDER: None

:COMMANDS: cli:daccuracy:app.cli.main:Main, cli:two-d-labeled-slices-to-3d:app.cli.two_d_labeled_slices_to_3d:Main, gui:daccuracy-ui:app.gui.main:Main

:DEPENDENCIES_MANDATORY: matplotlib, nicegui, numpy, pillow, scikit-image, scipy
:DEPENDENCIES_OPTIONAL: None
